#
# ChangeLog for cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/Broker.hlp
#
# Generated by Trac 1.6
# Jun 1, 2024, 2:42:16 AM

Fri, 08 May 2015 10:57:54 GMT healthsevak [1691]
	* cprs/branches/HealthSevak-CPRS/BDK50 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D2005.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D2005.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D2006.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D2006.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D2007.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D2007.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D50.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D50.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D60.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D60.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D70.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_D70.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R2005.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R2005.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R2006.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R2006.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R2007.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R2007.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R50.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R50.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R60.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R60.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R70.bpl (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Bin/XWB_R70.dcp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/AddServer.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/AddServer.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/CCOWRPCBroker.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/CCOW_const.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Hash.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Loginfrm.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Loginfrm.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/MFunStr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/RpcNet.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/RpcSLogin.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/RpcbEdtr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/RpcbErr.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Rpcberr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Rpcconf1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Rpcconf1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Rpcnet.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/SelDiv.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/SgnonCnf.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Sgnoncnf.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Splvista.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Splvista.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Trpcb.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/VCEdit.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/VCEdit.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/VERGENCECONTEXTORLib_TLB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/WSockc.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/XWBReg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/XWBRich20.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/XWB_D2005.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/XWB_R2005.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/XlfSid.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/Xwbut1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fDebugInfo.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fDebugInfo.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fPlinkpw.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fPlinkpw.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fRPCBErrMsg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fRPCBErrMsg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fRPCSharedBrokerSessionMgr1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fSSHUsername.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fSSHUsername.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fSgnonDlg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fSgnonDlg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fSignonConfigColor.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/fVistaBar.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/frmSignonMessage.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/frmSignonMessage.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2005/seldiv.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/AddServer.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/Loginfrm.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/RpcbErr.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/Rpcconf1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/Rpcnet.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/SelDiv.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/SgnonCnf.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/Splvista.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/VCEdit.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fDebugInfo.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fPlinkpw.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fRPCBErrMsg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fRPCSharedBrokerSessionMgr1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fSSHUsername.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fSgnonDlg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fSignonConfigColor.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/fVistaBar.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/frmSignonMessage.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2006/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/AddServer.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/AddServer.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/CCOWRPCBroker.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/CCOW_const.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Hash.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Loginfrm.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Loginfrm.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/MFunStr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/RpcNet.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/RpcSLogin.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/RpcbEdtr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/RpcbErr.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Rpcberr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Rpcconf1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Rpcconf1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Rpcnet.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/SelDiv.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/SgnonCnf.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Sgnoncnf.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Splvista.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Splvista.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Trpcb.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/VCEdit.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/VCEdit.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/VERGENCECONTEXTORLib_TLB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Wsockc.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/XWBReg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/XWBRich20.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/XWB_D2007.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/XWB_R2007.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/XlfSid.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/Xwbut1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fDebugInfo.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fDebugInfo.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fPlinkpw.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fPlinkpw.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fRPCBErrMsg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fRPCBErrMsg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fRPCSharedBrokerSessionMgr1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fSSHUsername.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fSSHUsername.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fSgnonDlg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fSgnonDlg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fSignonConfigColor.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/fVistaBar.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/frmSignonMessage.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/frmSignonMessage.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D2007/seldiv.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/AddServer.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/AddServer.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/CCOWRPCBroker.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/CCOW_const.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Hash.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Loginfrm.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Loginfrm.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/MFunStr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/RpcSlogin.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/RpcbErr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/RpcbErr.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Rpcbedtr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Rpcconf1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Rpcconf1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Rpcnet.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Rpcnet.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/SelDiv.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/SelDiv.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/SgnonCnf.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/SgnonCnf.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Splvista.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Splvista.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Trpcb.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/VCEdit.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/VCEdit.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/VERGENCECONTEXTORLib_TLB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/XWBReg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/XWBRich20.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/XWB_D50.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/XWB_R50.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/XlfSid.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/Xwbut1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fDebugInfo.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fDebugInfo.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fPlinkpw.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fPlinkpw.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fRPCBErrMsg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fRPCBErrMsg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fRPCSharedBrokerSessionMgr1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fSSHUsername.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fSSHUsername.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fSgnonDlg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fSgnonDlg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fSignonConfigColor.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/fVistaBar.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/frmSignonMessage.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/frmSignonMessage.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D5/wsockc.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/AddServer.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/AddServer.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/CCOWRPCBroker.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/CCOW_const.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Hash.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Loginfrm.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Loginfrm.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/MFunStr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/RpcSlogin.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/RpcbErr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/RpcbErr.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Rpcbedtr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Rpcconf1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Rpcconf1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Rpcnet.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Rpcnet.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/SelDiv.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/SelDiv.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/SgnonCnf.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/SgnonCnf.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Splvista.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Splvista.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Trpcb.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/VCEdit.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/VCEdit.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/VERGENCECONTEXTORLib_TLB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/XWBReg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/XWBRich20.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/XWB_D60.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/XWB_R60.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/XlfSid.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/Xwbut1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fDebugInfo.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fDebugInfo.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fPlinkpw.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fPlinkpw.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fRPCBErrMsg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fRPCBErrMsg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fRPCSharedBrokerSessionMgr1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fSSHUsername.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fSSHUsername.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fSgnonDlg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fSgnonDlg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fSignonConfigColor.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/fVistaBar.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/frmSignonMessage.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/frmSignonMessage.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D6/wsockc.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/AddServer.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/AddServer.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/CCOWRPCBroker.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/CCOW_const.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Hash.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Loginfrm.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Loginfrm.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/MFunStr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/RpcNet.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/RpcSLogin.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/RpcbEdtr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/RpcbErr.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Rpcberr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Rpcconf1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Rpcconf1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Rpcnet.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/SelDiv.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/SgnonCnf.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Sgnoncnf.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Splvista.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Splvista.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Trpcb.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/VCEdit.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/VCEdit.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/VERGENCECONTEXTORLib_TLB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/WSockc.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/XWBReg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/XWBRich20.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/XWB_D70.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/XWB_R70.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/XlfSid.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/Xwbut1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fDebugInfo.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fDebugInfo.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fPlinkpw.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fPlinkpw.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fRPCBErrMsg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fRPCBErrMsg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fRPCSharedBrokerSessionMgr1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fSSHUsername.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fSSHUsername.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fSgnonDlg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fSgnonDlg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fSignonConfigColor.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/fVistaBar.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/frmSignonMessage.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/frmSignonMessage.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/D7/seldiv.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/Broker.hlp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/INETWH32.dll (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/ROBOEX32.DLL (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/broker.FTG (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/broker.GID (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/broker.als (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/broker.cnt (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Help/broker.toc (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/ROBOEX32.DLL (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006 (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.bdsproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.dpr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.dsk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.exe (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.identcache (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/BrokerExample.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/__history (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fBrokerExample.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fBrokerExample.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fBrokerExample.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fOKToTerminate.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fOkToTerminate.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fOkToTerminate.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fVistAAbout.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/fVistAAbout.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples D2006/RPCBroker/BrokerEx/frmVistAAbout.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/BrokerExample.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/BrokerExample.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/BrokerExample.dpr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/BrokerExample.exe (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/BrokerExample.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/Shortcut to BrokerExample.exe.lnk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fBrokerExample.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fBrokerExample.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fBrokerExample.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fBrokerExample.~dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fBrokerExample.~pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fOkToTerminate.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fOkToTerminate.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fOkToTerminate.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fVistAAbout.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/fVistAAbout.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Samples/RPCBroker/BrokerEx/frmVistAAbout.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/AddServer.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/AddServer.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/AddServer.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/CCOWRPCBroker.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/CCOWRPCBroker.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/CCOW_const.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/CCOW_const.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Hash.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Hash.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/IISBase.inc (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Loginfrm.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Loginfrm.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Loginfrm.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/MFunStr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/MFunStr.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1.dpr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1.exe (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1.tlb (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1_TLB.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1_TLB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1_TLB.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1_TLB_SRB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr1_TLB_SRB.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2.dpr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2.exe (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2.identcache (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2.tlb (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2_TLB.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgr2_TLB_SRB.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RPCSharedBrokerSessionMgrA.tlb (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RpcConf1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RpcConf1.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RpcNet.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RpcSLogin.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RpcSlogin.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RpcbErr.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/RpcbErr.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Rpcbedtr.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Rpcberr.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Rpcconf1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Rpcnet.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Rpcnet.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SelDiv.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SelDiv.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SgnonCnf.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SgnonCnf.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Sgnoncnf.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBrokerReg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBrokerReg.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBrokerSink.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBrokerSink.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2005.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2005.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2005.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2005.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2006.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2006.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2006.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2006.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2007.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2007.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2007.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2007.dproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2007.dproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D2007.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D50.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D50.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D50.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D50.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D60.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D60.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D60.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D60.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D70.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D70.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D70.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D70.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_D90.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2005.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2005.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2005.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2005.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2006.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2006.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2006.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2006.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2007.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2007.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2007.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2007.dproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2007.dproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R2007.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R50.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R50.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R50.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R50.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R60.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R60.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R60.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R60.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R70.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R70.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R70.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R70.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/SharedRPCBroker_R90.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Splvista.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Splvista.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Splvista.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/TCCOWRPCBroker.bmp (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Trpcb.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Trpcb.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestBroker.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestBroker.dpr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestBroker.exe (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestBroker.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestMFunStr.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestMFunStr.dpr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestMFunStr.exe (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/UnitTestMFunStr.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/VCEdit.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/VCEdit.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/VCEdit.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/VERGENCECONTEXTORLib_TLB.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/VERGENCECONTEXTORLib_TLB.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/VERGENCECONTEXTORLib_TLB.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Wsockc.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWBReg.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWBRich20.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWBRich20.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2005.bdsproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2005.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2005.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2005.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2005.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2005.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2006.bdsproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2006.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2006.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2006.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2006.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2006.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2007.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2007.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2007.dproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2007.dproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D2007.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D50.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D50.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D50.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D50.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D50.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D60.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D60.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D60.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D60.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D60.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D70.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D70.dcr (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D70.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D70.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D70.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_D90.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2005.bdsproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2005.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2005.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2005.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2005.identcache (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2005.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2006.bdsproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2006.bdsproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2006.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2006.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2006.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2007.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2007.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2007.dproj (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2007.dproj.local (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R2007.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R50.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R50.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R50.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R50.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R60.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R60.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R60.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R60.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R70.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R70.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R70.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R70.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XWB_R90.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XlfSid.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/XlfSid.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Xwbut1.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/Xwbut1.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/__history (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/dunit.ini (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fDebugInfo.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fDebugInfo.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fDebugInfo.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fPlinkpw.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fPlinkpw.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fPlinkpw.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fRPCBErrMsg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fRPCBErrMsg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fRPCBErrMsg.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fRPCSharedBrokerSessionMgr1.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fRPCSharedBrokerSessionMgr1.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSSHUsername.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSSHUsername.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSSHUsername.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSgnonDlg.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSgnonDlg.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSgnonDlg.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSignonConfigColor.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fSignonConfigColor.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fVistaBar.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fVistaBar.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/fVistaBar.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/frmSignonMessage.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/frmSignonMessage.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/frmSignonMessage.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/frmVistAAbout.dfm (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/frmVistAAbout.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/seldiv.dcu (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker.cfg (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker1.dof (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker1.dpk (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker1.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uSharedBroker1.res (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uUnitTestBroker.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/uUnitTestMFunStr.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/Source/wsockc.pas (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50/XWB_1_1P50README.TXT (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/BDK32_P50T4.zip (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/Current List of Changes in XWB-1_1-50.txt (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/Manual installation of RPCBroker test patch 50 BDK.txt (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/Perforce Installation of RPCBroker test patch 50 BDK.txt (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/Perforce Installation of RPCBroker test patch 50_T4 BDK.txt (added)
	* cprs/branches/HealthSevak-CPRS/BDK50/XWB1_1P50T1.zip (added)

	Committing the files for first time to this new branch


